Interpixel-isolation of two adjacent pixels of an irradiated p-spray SC-8.00E-08-6.00E-08-4.00E-08-2.00E-080.00E+002.00E-084.00E-086.00E-088.00E-08-2-1.5-1-0.500.511.52Voltage(V)

Current(A)IV of S1_03S_ST2_026.1 x 10^14 protons/cm^-2P.SkubicUniversity of Oklahoma.