0 2 4 6 8 10 12 14 16 18 20 22 24 0

1

2

3

4

5 htemp Nent = 31 Mean = 6.323 RMS = 6.473

BPHI.nchphi_{htemp}

# J/Psi with mass 0.75 - 8.45

Kalman Fitter