0.0 20.0 40.0 60.0 80.0 100.0 Events

50.0

100.0

150.0

200.0

250.0

Ε(μ)

Figure 7: The validation error (in microns) vs. the number of predicted events for 3 estimates.

Mean

Maximum

Median