0.0 0.2 0.4 0.6 0.8 1.0 Predicted z 0.0

0.2

0.4

0.6

0.8

1.0

Actual z

Figure 3a: The actual vs. the predicted values of z for 282 events from a network trained with the same 282 events, before ordering the input nodes